)c (GeV/ Tp 0 5 10

)c b/GeV/ μ (_Tpdy/dσ^2d

1-10

1

10

210 = 7 TeV s pp, _+ cΛ combination of analyses

Λ_eν^+ and e S 0 , pK

+π^-pK | < 0.5 y|

3.5% lumi. uncertainty not shown ±

ALICE

GM-VFNS

+PYTHIA6

POWHEG

)c (GeV/ Tp 0 5 10

POWHEG

Data

1 10

)c (GeV/ Tp 0 5 10

GM-VFNS

Data

1 10